X-Git-Url: https://www.chiark.greenend.org.uk/ucgi/~mdw/git/runlisp/blobdiff_plain/3dc9c14b343e27b17e149dd6c474d613c337bbd9..1f79a05:/lgpl.tex

diff --git a/lgpl.tex b/lgpl.tex
index 554079b..2f850fc 100644
--- a/lgpl.tex
+++ b/lgpl.tex
@@ -1,7 +1,5 @@
 % \iffalse <meta-comment>
 %
-% $Id: lgpl.tex,v 1.2 2004/04/08 01:36:24 mdw Exp $
-%
 % The GNU Library General Public License as a LaTeX section
 %
 % (c) 1989, 1991 Free Software Foundation, Inc.
