X-Git-Url: https://www.chiark.greenend.org.uk/ucgi/~mdw/git/runlisp/blobdiff_plain/02c378f34a03892e2db0277f6a9a64c1dc38b85a..fcc208c558816bbbf9df27f21b007c3f50dcdef5:/lgpl.tex

diff --git a/lgpl.tex b/lgpl.tex
index 2f850fc..f421d54 100644
--- a/lgpl.tex
+++ b/lgpl.tex
@@ -192,7 +192,7 @@ Public License rather than by this special one.
       on the Library (independent of the use of the Library in a tool for
       writing it).  Whether that is true depends on what the Library does and
       what the program that uses the Library does.
-  
+
 \item [1.] You may copy and distribute verbatim copies of the Library's
       complete source code as you receive it, in any medium, provided that
       you conspicuously and appropriately publish on each copy an appropriate
