X-Git-Url: http://www.chiark.greenend.org.uk/ucgi/~mdw/git/sod/blobdiff_plain/9b53c8fc05a9cad189e941e0160a601523b72433..e0808c472145fc81e52898bc9ac289e10c4f4f41:/doc/misc.tex

diff --git a/doc/misc.tex b/doc/misc.tex
index 92223d1..e910956 100644
--- a/doc/misc.tex
+++ b/doc/misc.tex
@@ -7,7 +7,7 @@
 
 %%%----- Licensing notice ---------------------------------------------------
 %%%
-%%% This file is part of the Sensble Object Design, an object system for C.
+%%% This file is part of the Sensible Object Design, an object system for C.
 %%%
 %%% SOD is free software; you can redistribute it and/or modify
 %%% it under the terms of the GNU General Public License as published by
