X-Git-Url: http://www.chiark.greenend.org.uk/ucgi/~mdw/git/sod/blobdiff_plain/42291726898a019030c265b1063eac5d1d7bf173..17c7c784e0632dff2f93a69a837585fd6f31f4a1:/doc/misc.tex

diff --git a/doc/misc.tex b/doc/misc.tex
index 8b7536c..5767c3e 100644
--- a/doc/misc.tex
+++ b/doc/misc.tex
@@ -129,6 +129,11 @@ These symbols are defined in the @|sod-utilities| package.
     {mappend @<function> @<list> \&rest @<more-lists> @> @<result-list>}
 \end{describe}
 
+\begin{describe}{fun}
+    {distinguished-point-shortest-paths @<root> @<neighbours-func>
+      @> @<list>}
+\end{describe}
+
 \begin{describe}{cls}{inconsistent-merge-error (error) \&key :candidates}
 \end{describe}
 
@@ -568,7 +573,8 @@ These symbols are defined in the @!optparse| package.
 \begin{describe}{var}{*debugout-pathname*}
 \end{describe}
 
-\begin{describe}{fun}{test-module @<path> @<reason>}
+\begin{describe}{fun}
+    {test-module @<path> \&key :reason :clear :backtrace @> @<status>}
 \end{describe}
 
 \begin{describe}{fun}
