X-Git-Url: http://www.chiark.greenend.org.uk/ucgi/~mdw/git/sod/blobdiff_plain/118f5c0006f241bc7c03a7741f73b87b92b4e938..8ca4a019fd9fd7bf037b928116d5bf8fb57407ba:/doc/misc.tex

diff --git a/doc/misc.tex b/doc/misc.tex
index ba76cd8..e97fcb0 100644
--- a/doc/misc.tex
+++ b/doc/misc.tex
@@ -568,7 +568,7 @@ These symbols are defined in the @!optparse| package.
 \begin{describe}{var}{*debugout-pathname*}
 \end{describe}
 
-\begin{describe}{fun}{test-module @<path> \&key :reason @> @<status>}
+\begin{describe}{fun}{test-module @<path> \&key :reason :clear @> @<status>}
 \end{describe}
 
 \begin{describe}{fun}
